40 50 60 70 80 90 Scattered Angle (deg) 0.0

0.5

1.0

E_f/E_i

4.6 eV 7.3 eV

0.0

0.5

1.0

1.5

E_f/E_i

Fig. 8

1.5 eV 2.6 eV